<p><span style="font-size: medium;"><strong>Premier Volt Twin Themostatic Shower Valve - JTY301</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Premier Volt Twin Themostatic Shower Valve</li>
<li>Dimensions: Height 215 mm, Width: 120 mm, Depth: 133 mm</li>
<li>Minimum operating pressure: 0.1 bar</li>
<li>Finish: Chrome</li>
<li>Can be fitted vertically or horizontally</li>
<li>Accurate flow control</li>
<li>Thermostatic control to +/- 2 degree - even if the water pressure fluctuates</li>
<li>Full thermal protection to prevent scalding in the event of hot or cold water shut off</li>
<li>In the event of hot or cold water failure the valve will shut down within 1.5 seconds</li>
<li>The patented cartridge is highly resistant to calcium build up - even in hard water areas</li>
<li>Our valves are suitable for use with all systems: gravity fed pumped unvented high pressure or fully modulated combi-boilers</li>
<li>Excellent flow rates - even at low pressure</li>
<li>Our valves can deliver 5.5 litres per minute at 0.1 bar pressure</li>
<li>The cartridge is fully reversible meaning if hot and cold supplies are the wrong way round it doesn't need re-plumbing</li>
<li>Simply remove the cartridge turn 180&deg; and replace</li>
<li>Manufactured from solid brass</li>
</ul>
<imgalt="Premier" src="/media/wysiwyg/JTY301_2.jpg" />