<p><span style="font-size: medium;"><strong>Aeon Zenith Stainless Steel Towel Radiator</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Vertical mounting</li>
<li>Max. working pressure: 10</li>
<li>Finish: Brushed matt&comma; Polished</li>
<li>Modern Stainless steel design.</li>
<li>Max. working temperature: 120</li>
<li>Extremely easy to install and use.</li>
<li>Heating system (open/closed): O/C</li>
<li>Comes complete in eye&dash;catching finish.</li>
<li>Suitable for any central heating systems.</li>
<li>The clean crossbars are placed in sets of 3</ul>
<li>Gently warming your towels to keep out the chill.</li>
<li>Manufacture from high quality material and good strength.</li>
<li>Heavenly radiator is simply designed and superbly engineered.</li>
<li>We recommend pipework is not installed until receipt of radiator.</li>
<li>Giving you the perfect heating solution for any bathroom or en&dash;suite.</li>
</ul>
<p><span style="font-size: medium;"><strong>Key Information</strong></span></p>
<ul>
<li>Fuel options: E: Electric only H: Hot Water only D: Dual Fuel.</li>
<li>Outputs published are to EN442 at &Delta; T50. Multiply by 1.268 to convert the outputs to &Delta;T60.</li>
<li>Pipe centre measurements are incorporating pair of valve distance of 45mm each where applicable.</li>
</ul>