<p><span style="font-size: medium;"><strong>Hudson Reed Tec Lever Bath Shower Mixer with Swivel Spout - TEL354</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Chrome finish.</li>
<li>Dimensions: Height 228mm x Width 180mm</li>
<li>Bath shower mixer with swivel spout</li>
<li>Supplied with shower kit and wall bracket</li>
<li>Ceramic disk technology for easy operation</li>
<li>Complies with BS5412, EN200</li>
<li>Suitable for all plumbing systems</li>
<li>Minimum operating pressure 0.2 bar</li>
</ul>
