<p><span style="font-size: medium;"><strong>Blanco Subline 350/350-U Silgranit Undermount Kitchen Sink</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Bowl(s) depth: 200/200mm</li>
<li>Cabinet width minimum: 800mm</li>
<li>Cut out size: 725mm x 400mm x R15mm</li>
<li>Corner radius: 10mm</li>
</ul>
<p><span style="font-size: medium;"><strong>Consist of</strong></span></p>
<ul>
<li>Two 3 1&sol;2&quot; basket strainers</li>

<li>fixing kit 218 269</li>
</ul>
