<p><span style="font-size: medium;"><strong>Hansgrohe Focus Single Lever 160 Kitchen Sink Mixer Tap</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Focus Single Lever 160 CoolStart Eco Kitchen Sink Mixer Tap</li>
<li>ComfortZone 160 provides space for greater freedom of movement</li>
<li>Swivel spout 360&deg;</li>
<li>Ceramic cartridge with Eco handle position for a reduced flowrate by up to 50%</li>
<li>QuickClean technology for easy limescale removal</li>
</ul>
