<p><strong><span style="font-size: medium;">DRU RVS &Oslash;150/100 Concentric Flue Material Telescopic Pipe 275-390mm - Stainless Steel</span></strong></p>
<p><strong><span style="font-size: medium;">Features</span></strong></p>
<ul>

<li>Concentric flue pipe: telescopic 275-390mm</li>

<li>Finish: Stainless steel</li>

</ul>