<p><span style="font-size: medium;"><strong>Premier Round Ceramic Basin White 460mm - NBV006</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Dimension: H: 220 x w: 460mm x D 460mm</li>
<li>Finish: White</li>
<li>Product Material: Vitreous China</li>
<li>Fixings Supplied: No</li>
<li>Basin Tapholes: One Taphole</li>
<li>Basin Overflow Cover: No</li>
<li>Basin Chain Stay: No</li>
<li>Basin Template: Not Required</li>
<li>Basin Waste Type Required: Slotted</li>
<li>Includes Overflow?: Yes</li>
<li>Bowl Shape: Round</li>
<li>Bottle Trap Included: No</li>
<li>Number Of Bowls: 1</li>
<li>Assembly Required: No</li>
<li>Commercial Use: No</li>
<li>Fixings Included: No</li>
<li>Basin Type: Countertop</li>
<li>Backsplash Included: No</li>
<li>Inner Bowl Dimension - Height: 155mm</li>
<li>Inner Bowl Dimension - Width: 395mm</li>
<li>Inner Bowl Dimension - Depth: 295mm</li>
<li>Installation Required: Yes</li>
<li>The soft square forms are an ideal balance between contemporary and organic design</li>
<li>Perfect for countertops</li>
<li>Suitable for mono basin mixers</li>
<li>Manufactured from high quality vitreous china</li>
</ul>
