<p><span style="font-size: medium;"><strong>Premier Easy Clean Hand Shower - HO302</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Premier Easy Clean Hand Shower</li>
<li>Dimensions: Height 245 mm, Width: 97 mm, Depth: 56 mm</li>
<li>Minimum operating pressure: 0.1 bar</li>
<li>Finish: Chrome</li>
<li>With easy clean nozzles</li>
</ul>
