<p><span style="font-size: medium;"><strong>Evonic E810DS Built-in Electric Tunnel Fire</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Glass size: W 803mm H 1003mm</li>
<li>803mm flame effect</li>
<li>Heat output: 750/1500W</li>
<li>Dual sided heater</li>
<li>E-touch app controlled</li>
<li>Schott conturan magic&reg; anti-reflective front glass</li>
<li>Two sided tunnel fire</li>
<li>Woodland or silver birch logs</li>

</ul>