<p><span style="font-size: medium;"><strong>Hansgrohe Croma Select E 110 1jet Unica 0.90m Shower Kit</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Croma Select E 1jet 0.90m Shower Set</li>
<li>Spray type: Rain</li>
<li>Shower head size: 110 mm</li>
<li>90&deg; position adjustable slider, pivots left and right, up and down</li>
<li>Maximum flow rate (at 3 bar): 16 l/min</li>
<li>Wall bar spacer (grey)</li>
<li>Chrome-plated wall supports of plastic</li>
</ul>
<p><span style="font-size: medium;"><strong>Consists of</strong></span></p>
<ul>
<li>Isiflex shower hose 1.60m (<span style="text-decoration: underline;"><a href="https://nexus-home.com/hansgrohe-isiflex-1-60m-shower-hose-28276000" target="_blank">28276000</a></span>)</li>
<li>Croma Select E 1jet hand shower (<span style="text-decoration: underline;"><a href="https://nexus-home.com/hansgrohe-croma-select-e-110-1jet-hand-shower-26814400" target="_blank">26814400</a></span>)</li>
<li>Unica&rsquo;Croma wall bar 0.90 m (26504000)</li>
</ul>