<p><span style="font-size: medium;"><strong>Premier Rectangular Slide Rail Shower Kit Chrome - N-STY059</strong></span></p><p>The <span style="text-decoration: underline;"><a title="Premier" href="/brands/premier.html" target="_blank">Premier</a></span> rectangular slide rail kit features a minimalist rectangular slider rail, with a matching handset, all finished in chrome. This rectangular slider rail kit is designed to be used in conjunction with a concealed or exposed shower valve to complement any modern bathroom.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Manufactured from high quality brass</li>
<li>Contemporary round designs</li>
<li>Impressive chrome finish</li>
<li>Pipe size: 15 mm (1/2" BSP)</li>
<li>Minimum operating pressure: 0.10 bar</li>
<li>Easy clean head</li>
<li>Round shower head</li>
<li>Stain rust resistant: Yes </li>
<li>5 Years  guarantee</li>
</ul>