<p><span style="font-size: medium;"><strong>Reina Neva Double Panel Vertical Designer Radiator - White 1500 x 295mm</strong></span></p><p style="text-align: justify;">Reina Radiators established in 2005, entirely comply with the producing and crafting standards of the best <span style="color: #3366ff;"><a href="/heating/designer-radiators.html" target="_blank"><span style="text-decoration: underline; color: #3366ff;">designer radiators</span></a></span>. Now they have introduced the new Reina Neva designer radiator, which is more functional than being more stylish. Reina Neva is available in vertical fitting style with a white finish. This vertical radiator gives maximum 1214 watts heating. This double panel radiator is as well greatly compatible with the houses that have central heating system. This central heating radiator comes in 10 tube sections with the size available in 1500 x 295mm while the wall distance of this white radiator is of 103mm.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Output (Watts) &commat; Delta 70: 1247 </li>
<li>Output (BTU) &commat; Delta 70: 4252 </li>
<li>Comes in white/anthracite finish</li>
<li>Tube quantity: 10</li> 
<li>Water content: 12.71 l/min</li>
<li>Constructed from superior quality steel material</li>
<li>Suitable for Central Heating system only</li>
<li>5 Years guarantee from manufacturer</li>
</ul>