<p><span style="font-size: medium;"><strong>Rak Flip Top Slotted Basin Waste</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Finish: Chrome</li>
<li>Material: Brass</li>
<li>Weight: 0.2 Kg</li>
<li>Flip top mechanism</li>
<li>Basin waste including cover</li>
<li>2 Years manufacturer guarantee</li>
</ul>