<p><span style="font-size: medium;"><strong>HIB Ambience 120 LED Illuminated Mirror 600mm x 1200mm - 79300000</strong></span></p>
<p style="text-align: justify;">The HIB Ambience 120 LED Illuminated Mirror 600mm x 1200mm includes the latest colour temperature changing technology. You can change the light from cool white to warm white and every shade in-between at the touch of a button.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>HIB Ambience 120 LED Illuminated Mirror 600mm x 1200mm</li>
<li>Dimensions: Height 600mm x Width 1200mm x Depth 40mm</li>
<li>Installation type: Landscape or Portrait</li>
<li>Comes with LED colour temperature changing ambient lighting</li>
<li>Fitted with heated pad - helps to clear condensation from the central area of the mirror</li>
<li>LED illumination with smooth transition between warm &amp; cool white illumination</li>
<li>Features touch switch - simply press the button to turn the illumination on &amp; off or hold to select colour temperature (With memory function the mirror will remember your personal setting)</li>
<li>IP44 rated - electrically safe for use in the bathroom</li>
</ul>