<p><span style="font-size: medium;"><strong>Hansgrohe Ecostat E Concealed Thermostatic Mixer - 15705000 </strong></span></p>
<p><span style=""font-size: medium;""><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Ecostat E Concealed Thermostatic Mixer</li>
<li>Safety stop at 40&deg;C</li>
<li>Flow rate: 37.9 l/min</li>
<li>Wall-mounted</li>
</ul>
