<p><span style="font-size: medium;"><strong>Hansgrohe Talis S 3 Hole Rim-mounted Bath Mixer & Secuflex</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Talis S 3 Hole Single Lever Rim-mounted Bath Mixer Tap with Secuflex</li>
<li>Finish: Chrome</li>
<li>Spout 200 mm long</li>
<li>Normal and spray jet</li>
<li>Bath flow rate: 22 l/min at 3 bar</li>
<li>Ceramic cartridge</li>
<li>Maximum pull-out length of hand shower: 1.10 m</li>
<li>Integrated shower support</li>
<li>Designed to run 2 outlets</li>
<li>Rim-mounted</li>
<li>QuickClean technology for easy limescale removal</li>
<li>Operating pressure: min. 1 bar/max. 10 bar</li>
<li>Includes: handle, escutcheons, bath spout with diverter, ceramic cartridge</li>
</ul>
<p><span style="font-size: mediuml;"><strong>Consists of</strong></span></p>
<ul>
<li>Croma Select S 110 1jet hand shower (26804400)</li>
</ul>
