<style>#html-body [data-pb-style=GL1593B]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="GL1593B"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Blanco Culina-S II Sensor Single Lever Kitchen Tap - PVD Steel</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Metal-sheathed spray hose</li>
<li>Electrical connection to 230V required</li>
<li>Battery backup and batteries included</li>
<li>With electronic cartridge and valve box</li>
<li>Easy and fast professional mixer tap installation with the BLANCOLock</li>
<li>Supplied with electrical plug and integrated battery backup</li>
<li>Wave sensor on the tap body activates hands-free operation</li>
<li>Hands-free sensor on the spray arm activates automatic operation</li>
<li>Iconic mixer tap combining exquisite design with semi-pro functionality</li>
<li>Manual or hands-free operation with ingenious dual sensor technology integrated in the hose arm and tap body for optimised kitchen workflows</li>
</ul>
<p><span style="font-size: medium;"><strong>Scope of supply</strong></span></p>
<ul>
<li>180° swivel spout for greater reach</li>
<li>Ø 35mm tap hole required</li>
<li>700 mm flexible connection pipes with ⅜'' nut for easier installation</li>
<li>Requires balanced high pressure supply only, minimum 1.0 bar</li>
<li>Fit metal tap stabilising bracket if required, item No. 513383</li>
</ul></div></div></div>