<p><span style="font-size: medium;"><strong>Hansgrohe Talis Select S 80 Basin Mixer Tap</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Talis Select S 80 Basin Mixer Tap with Temperature Ccontrol</li>
<li>Finish : Chrome</li>
<li>ComfortZone 80 provides space for greater freedom of movement</li>
<li>Spout 97 mm long</li>
<li>Normal spray</li>
<li>5 l/min at 3 bar</li>
<li>Operating pressure: min. 1 bar/max. 10 bar</li>
<li>Deck mounted</li>
<li>Select Cartridge with temperature control</li>
<li>QuickClean technology for easy limescale removal</li>
<li>If running with a pump, please specify a universal (negative head) pump</li>
<li>Without waste / With Pop-up waste</li>
</ul>
