<p><span style="font-size: medium;"><strong>Valor Masquerade HE Slimline Inset Gas Fire </strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Radiant and convected heat</li>
<li>Slimline glass fronted high efficiency</li>
<li>Realistic coal effect fuel bed</li>
<li>Colour: Black and Pale Gold</li>
<li>Max heat output: 3.1kw</li>
<li>Nett efficiency rating: 80%</li>
<li>Gas type: Natural gas</li>
<li>Flame effect type: Gas</li>
<li>Control type: Fire slide</li>
<li>Fuel Beds: Coal</li>
</ul>

