<style>#html-body [data-pb-style=RXAO3Q4]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="RXAO3Q4"><div data-content-type="text" data-appearance="default" data-element="main"><p><strong><span style="font-size: medium;">DRU Global 55XT Cavity Built in Balanced Flue Gas Fires</span></strong></p>
<p>The Global 55XT Cavity BF built in <a title="Balanced Flue Gas Fires" href="/fires/gas-fires/balanced-flue-gas-fires.html" target="_self"><strong>Balanced Flue gas fire</strong></a> from DRU is the perfect solution for you if your home does not have a traditional chimney or if you cannot get a false chimney breast installed. The Global 55XT Cavity BF model with its slim depth can easily be installed into a cavity wall in your home without taking up valuable floor space. It also has a rear-vented balanced flue which makes this gas fire the perfect solution for your home.</p>
<p>The Global 55XT Cavity BF from Dru features the unique Global Truflame Burner® which allows it to display the perfect log flame effect for your home. It has a heat output ranging from 1.8kW to 3.2kW with 77.4% energy efficiency.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Energy efficiency class: <a title="Energy efficiency class" href="/media/pdf/Energy_label_Global_55XT_Cavity_BF_RCE.pdf" target="_blank" rel="noopener"><img style="width: 35px; height: 20px;" src="/media/wysiwyg/d.jpg" alt="Energy label" width="35" height="20"></a></li>
<li>Front view square shaped gas fire</li>
<li>Suitable for natural gas or LPG</li>
<li>Open combustion system (balanced flue)</li>
<li>Glass window: Standard glass, Anti-reflective (Clear View) glass optional</li>
<li>Door type: Fixed door</li>
<li>Control: Remote control</li>
<li>Thermostat: Yes</li>
<li>Control hatch (Optional)</li>
<li>Line Burner®</li>
<li>Interior finish: Ceraglass (highly polished black, mirror like affect)</li>
<li>Fire bed: Brown logs</li>
</ul>
<p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Flue: Top</li>
<li>Efficiency: 74.3%</li>
<li>Flue Ø: 100mm</li>
<li>Heat output max: 4.4 kw</li>
</ul></div></div></div>