<p><span style="font-size: medium;"><strong>Hudson Reed Tec Lever Bath Filler with Swivel Spout - TEL353</strong></span></p>
<p style="text-align: justify;">If you a want a tap that is simple yet elegantly designed to offer your bathroom high aesthetics then Hudson Reed designs the perfect solution for you with the engineering of Hudson Reed Tec a bath filler tap. This <a href="/taps/bathroom-taps/bath-taps.html" target="_blank"><span style="color: #3366ff;"> bath mixer tap </span></a>with dual lever controls at each side of the swivel spout is manufactured from solid brass while offered in polish chrome this deck mounted bath tap will prove to be worthy to spend your money on. With the inclusion of hi-tech designing this chrome tap let you mix the cold and water while offering maximum protection as well. With the efficiency of working under 0.5 bar water pressure, this deck mounted bath mixer with 227mm height is perfect to be used in the places with high water pressure system.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Swivel spout</li>
<li>Ease of use without compromising on design</li>
<li>High quality brass internals with luxury chrome finish</li>
<li>Ceramic disc technology for long life and smooth operation</li>
</ul>
<p><span style="font-size: medium;"><strong>Specification</strong></span></p>
<ul>
<li>Pipe centres: 180mm</li>
<li>Valve&sol;cartridge type: 1&sol;4 turn ceramic disc</li>
<li>Product material: Brass</li>
<li>Pipe size: 22mm (3&sol;4&quot; bsp)</li>
<li>Operating pressure: 0.2</li>
<li>Flow rate 0.1bar l&sol;m (taps): 8 l&sol;min</li>
<li>Flow rate 0.5bar l&sol;m (taps): 29 l&sol;min</li>
<li>Flow rate 1bar l&sol;m (taps): 40 l&sol;min</li>
<li>Flow rate 2bar l&sol;m (taps): 48 l&sol;min</li>
<li>Tap spout projection (mm): 115</li>
<li>Height of spout (mm): 210</li>
<li>Deck plate included </li>
<li>Cartridge included </li>
<li>Tap tails included </li>
</ul>