<p><span style="font-size: medium;"><strong>RAK Concealed Urinal Auto Cistern 9L Capacity Complete</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions: Width 498mm x Height 295mm x Depth 186mm</li>
<li>Colour: White</li>
<li>For use with a 2 bowl urinal setup</li>
<li>9 litre urinal flushing capacity</li>
<li>Manufactured from high impact polystyrene</li>
</ul>
<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>
<li>2 years guarantee from manufacturer</li>
</ul>
