<p><span style="font-size: medium;"><strong>Roca Victoria Basic Unik Wall Hung 3 Drawers Base Unit & Basin 600mm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions: 755mm Height x 600mm Width x 460mm Depth</li>
<li>Base unit / closing and opening system: Soft close drawers</li>
<li>Base unit / doors and drawers combination: 3 drawers</li>
<li>Base unit / structure: Drawers</li>
<li>Finish: Gloss white</li>
<li>Basin / Taphole configuration: 1 taphole in the middle</li>
<li>Basin shape: Square</li>
<li>Installation type: Wall-hung, wall-hung with optional legs</li>
<li>Material / Basin: Vitreous china</li>
<li>Faucet installation: On the basin</li>
</ul>

<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>
<li>2 years guarantee on Base Unit </li>
<li>25 years guarantee on Basin</li>
</ul>
