<p><span style="font-size: medium;"><strong>Blanco ZIA XL 6 S Silgranit PuraDur II Inset Sink</strong></span></p>

<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Installation: Inset</li>
<li>Material: Granite</li>
<li>Cabinet width: 600mm</li>
<li>Bowl depth: 190mm</li>
<li>Can be installed reversibly </li>
<li>Modern design with clear lines</li>
<li>Handing options: Reversible</li>
<li>XL bowl for even more space when washing your dishes</li>
<li>Straight-lined outer contour emphasised by the narrow rim</li>
<li>Characteristic tap ledge as a frame that enlarges the drainer</li>
</ul>
<p><span style="font-size: medium;"><strong>Scope of supply</strong></span></p>
<ul>
<li>Waste fitting with space-saving pipe</li>
<li>3 1&sol;2&quot; basket strainer</li>
</ul>