<p><span style="font-size: medium;"><strong>Hansgrohe Croma Select S 110 Vario EcoSmart Hand Shower </strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Croma Select S Vario EcoSmart 9 l/ min Hand Shower</li>
<li>Shower head size: 110 mm</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Spray type: Rain, Turbo Rain, IntenseRain</li>
<li>Mininum operating pressure 1.5 bar</li>
<li>Easy to clean, white spray face</li>
</ul>


