<p><span style="font-size: medium;"><strong>Reina Breno Steel Towel Designer Radiator Chrome 350 x 700mm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Output (Watts) &commat; Delta 70: 235 </li>
<li>Output (BTU) &commat; Delta 70: 802 </li>
<li>Comes in chrome finish</li>	
<li>Water content: 3.0 l/min</li>
<li>Constructed from superior quality steel material</li>
<li>Suitable for Central Heating system only</li>
<li>5 Years guarantee from manufacturer</li>
</ul>