<p><span style="font-size: medium;"><strong>RAK Joy Motion Sensor Led Light In Stainless Steel - JOYUSBRCCR</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p><ul><li>Dimension: Width 70mm x Height 70mm x  Depth 25mm</li>
<li>Finish: Chrome</li>
<li>Mount type: Wall mounted</li>
<li>Material: Brass</li>
<li>Usb rechargeable</li>
</ul>
<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>
<li>2 Years manufacturer's guarantee </li>
</ul>
