<p><span style="font-size: medium;"><strong>Blanco Linus Kitchen Sink Mixer Tap</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Single-lever mixer tap</li>
<li>LGA approved</li>
<li>DVGW approved</li>
<li>Minimalist design</li>
<li>With ceramic disk cartridge</li>
<li>Spout can be swivelled by 360&deg;</li>
<li>&Oslash; 35 mm tap hole required</li>
<li>High spout for easy filling of pans and vases</li>
<li>Patented jet regulator for markedly reduced scaling</li>
<li>Available finishes: Chrome, Stainless Steel, Satin Gold</li>
<li>Spout can be swivelled through 360&deg; for greater cover</li>
<li>Stabilisation plate to increase the stability of the tap when fitted in stainless steel sinks</li>

<li>Flexible connector pipes, 450 mm long and 3&sol;8&quot; nut for particularly easy and safe installation</li>
</ul>

