<p><span style="font-size: medium;"><strong>Grohe Eurodisc Cosmopolitan Single Lever Shower Mixer Trim - 19549002</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Grohe Eurodisc Cosmopolitan Single Lever Shower Mixer Trim</li>
<li>Without concealed body</li>
<li>GROHE StarLight&reg; chrome finish</li>
<li>Metal lever</li>
<li>Escutcheon- and shaft-sealing</li>
<li>Wall escutcheon</li>
<li>Covered fixing</li>
</ul>
