<p><span style="font-size: medium;"><strong>Roca The Gap Single Ended Acrylic Bath 170cm x 75cm No Tap Hole - 24718000 </strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Single ended bath</li>
<li>White finish</li>
<li>Material: Acrylic</li>
<li>Shape: Rectangular</li>
<li>Sound insulation</li>
<li>Water capacity to overflow (l): 240 litres</li>
<li>Bath has fully encapsulated baseboards and adjustable feet</li>
</ul>
