<p><span style="font-size: medium;"><strong>HIB Qubic 120 Double Door LED Mirror Cabinet - 48000 </strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>HIB Qubic 120 Double Door LED Mirror Cabinet  </li>
<li>Size of Cabinet: Mirror Cabinet Width 1200mm x Mirror Cabinet Height 700mm x Mirror Cabinet Depth 125mm</li>
<li>Soft close hinges.</li>
<li>Double sided mirror doors.</li>
<li>IP44 Rated &mdash; Electrically Safe for use in bathroom</li>
<li>Integrated charging sockets, suitable for toothbrushes, shavers & trimmers.</li>
<li>LED colour temperature changing  double door cabinet with sensor switch, charging socket & soft close hinges.</li>
<li>Sensor switch, with colour temperature changing function. Simply wave hand to turn on/off & hold hand to change between warm & cool white illumination</li>
</ul>
