<p><span style="font-size: medium;"><strong>RAK Cube Single Cabinet & Mirrored Door H 600 x W 400mm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions: Width 400mm x Height 600mm x Projection 120mm</li>
<li>Constructed from the highest quality materials</li><li>Easily compliment for any type of bathroom</li>
<li> Mirror cabinet</li>
<li>Mirror door</li>
<li>Shelf: 1</li>
<li>Door drawer: 1</li>
<li>Color: Stainless steel</li>
<li>Style: Modern </li>
</ul>
<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>
<li>2 years guarantee against any manufacturer default</li>
</ul>

