<p><span style="font-size: medium;"><strong>Spartherm Sino L Free Standing Wood Burning Stove</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Energy efficiency class: <a title="Energy efficiency class" href="/media/pdf/Energy_label_Sino_L.pdf" target="_blank"><img alt="" src="/media/wysiwyg/a.jpg" height="20" width="35" /></a></li>
<li>Nominal heat output: 7kw</li>
<li>Thermal output range: 4,9-9,1 kw</li>
<li>Efficiency: >78 %</li>
<li>Door frame height: 746mm</li>
<li>Door frame width: 467 mm</li>
<li>Total height: 1270mm</li>
<li>Total width: 590mm</li>
<li>Total depth: 505mm</li>
<li>Flue pipe diameter: 150mm</li>
<li>Door function: hinged</li>
<li>Weight: 227 / 260 kg</li>
</ul>

