<p><span style="font-size: medium;"><strong>Reina Arnage Dry Electric Towel Radiator</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Comes in polished finish</li>

<li>Suitable for electric heating systems</li>
<li>Constructed from superior quality stainless steel material</li>
<li>25 Years guarantee from manufacturer</li>
</ul>