<p><span style="font-size: medium;"><strong>Element 4 Sky S T Gas Fire - Tunnel</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Burner(s): <span>Real Flame Burner M</span></li>
<li>Type of fireplace: Gas&nbsp;fire</li>
<li>Net natural gas capacity (min-max) G25: 2,5&nbsp;- 13,2&nbsp;kW</li>
<li>Net natural gas capacity (min-max) G20: 2,5&nbsp;- 14,5 kW</li>
<li>Net propane capacity (min-max) G31: 2,5 - 10,4&nbsp;kW</li>
<li>Efficiency: 89%</li>
<li>Black steel:&nbsp;(Standard)</li>
<li>Black glass:&nbsp;(Optional)</li>
<li>Connect to home automation: (Optional)</li>
<li>Operation via app: (Optional)</li>
<li>Powerfan: (Optional)</li>
<li>Anti-reflective glass: (Optional)</li>
<li>Control panel: (Optional)</li>
<li>Wall switch: (Optional)</li>
<li>Remote Control: (Standard)</li>
<li>Convection schedule (s): (Optional)</li>
<li>Puck: (Optional)</li>
</ul>
