<span style="font-size: medium;"><strong>Aeon Bosporus Stainless steel Towel Radiator</strong></span></p>
<span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Finish: Brushed matt&comma; Polished</li>
<li>A new take on ladder&dash;style heating</li>
<li>While the bold design ensures a strong visual impact.</li>
<li>Making the bosporus an ideal choice for a family bathroom.</li>
<li>The top airing shelf offers maximum space for towel storage.</li>
<li>Exquisitely handcrafted from high&dash;quality stainless steel for max effect</li>
<li>The bosporus is a bold space-saving boxy designed towel rail that makes a strong visual impact.</li>
</ul>
<p><img style="width: 673px; height: 60px;" src="/media/wysiwyg/aeon-radiators/spec-2.jpg" alt="Aeon"></p>
<p><span style="font-size: medium;"><strong>Key Information</strong></span></p>
<ul>
<li>Fuel options: E: Electric only H: Hot Water only D: Dual Fuel.</li>
<li>We recommend pipework is not installed until receipt of radiator</li>
<li>Outputs published are to EN442 at &Delta; T50. Multiply by 1.268 to convert the outputs to &Delta;T60.</li>
<li>Pipe centre measurements are incorporating pair of valve distance of 45mm each where applicable.</li>
</ul>