<p><span style="font-size: medium;"><strong>Premier Straight Bath Screen & Rail 77cm</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Dimensions: 1435mm Height x 790mm Width x 24mm Depth</li>
<li>Profile Finish: Polished Chrome</li>
<li>Profile Material: Aluminium</li>
<li>Enclosure Extras: Towel Rail</li>
<li>Support Bar Included: Support Bar Not Included</li>
<li>Easy Clean: No</li>
<li>Easy Fit: No</li>
<li>Radius: 350mm</li>
<li>Glass Thickness: 6mm</li>
<li>Enclosure Design: Frameless</li>
<li>Enclosure Adjust: 775mm-790mm</li>
<li>Swing In Dimensions: 760mm</li>
<li>Swing Out Dimensions: 760mm</li>
<li>Utilise space in your bathroom and create a showering space within your bath</li>
<li>Includes fixed safety rail</li>
<li>Every bath screen is reversible in order to perfectly fit your needs</li>
<li>This screen is made of 6mm toughened safety glass</li>
<li>Suitable for use with straight baths</li>
</ul>
