<p><span style="font-size: medium;"><strong>Hansgrohe Logis Shower Mixer for Exposed Installation</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Logis Single Lever Manual Shower Mixer for Exposed Installation</li>
<li>Finish: Chrome</li>
<li>Designed to run 1 outlet</li>
<li>Flow rate hand shower connection 17 l/min at 3 bar</li>
<li>Cartridge: ceramic cartridge</li>
<li>Wall-mounted</li>
<li>Operating pressure: min. 1 bar / max. 5 bar</li>
<li>Non-thermostatic</li>
</ul>
