<p><span style="font-size: medium;"><strong>HIB Apex 100 Double Door LED illumination Mirror Cabinet - 47300</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Ambient under cabinet lighting</li>
<li>Central divid for more effective storage.</li>
<li>Soft close hinges for that touch of luxury and gentle closure.</li>
<li>Double sided mirror doors, allowing you to use a mirror when the door is open.</li>
<li>Two integrated charging sockets.  Suitable for toothbrushes, shavers & trimmers.</li>
<li>100cm double door cabinet with LED illumination, mirrored sides and two charging sockets.</li>
<li>  These cabinets have a decorative mirror profile that reflects the wall/tile, so the cabinet matches the style of your bathroom.</li>
<li>  Light adjusting sensor switch, wave hand to turn on & off or hold hand to change colour temperature from cool white to warm white </li><li>The cabinet will keep this selection every time you turn it on & off.
</li>
</ul>
