<p><span style="font-size: medium;"><strong>RAK Exposed Urinal Auto Cistern 4.5L Capacity Complete</strong></span></p>p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions : Width 498mm x Height 295mm x Depth 186mm</li>
<li>Colour: White</li>
<li>For use with a 1 bowl urinal setup</li>
<li>4.5 litre urinal flushing capacity</li>
<li>Manufactured from high impact polystyrene</li>
</ul>
<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>
<li>2 years guarantee from manufacturer</li>
</ul>
