<p><span style="font-size: medium;"><strong>Hansgrohe Raindance E 360 Air 1jet Shower Head & 240mm Arm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Raindance E 360 Air 1jet Overhead Shower with 223mm Shower Arm</li>
<li>Shower head size: 360 x 190 mm</li>
<li>Shower arm length: 240 mm</li>
<li>Spray type: RainAir (rain jet enriched with air)</li>
<li>Flow rate RainAir (at 3 bar): 20 l/min</li>
<li>Operating pressure: min. 1.5 bar / max. 6 bar</li>
<li>Fully chrome-plated spray face</li>
<li>Material spray face: metal</li>
<li>Spray disc removeable for cleaning</li>
<li>Installation type: wall</li>
</ul>


