<style>#html-body [data-pb-style=AEQGAF4]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="AEQGAF4"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Hansgrohe Croma Select S 110 Vario Porter 1.60m Hand Shower</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Croma Select S Vario Porter 1.60 m Shower Set</li>
<li>Spray type: Rain, IntenseRain, Turbo Rain</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Shower head size: 110 mm</li>
<li>Maximum flow rate (at 3 bar): 15 l/min</li>
<li>Chrome-plated wall supports of plastic</li>
</ul>
<p><span style="font-size: medium;"><strong>Consists of</strong></span></p>
<ul>
<li>Croma Select S Vario hand shower (<span style="text-decoration: underline;"><a href="https://nexus-home.com/hansgrohe-croma-select-s-110-vario-hand-shower-26802400" target="_blank" rel="noopener">26802400</a></span>)</li>
<li>Porter'S shower Support (<span style="text-decoration: underline;"><a href="https://nexus-home.com/hansgrohe-porter-s-shower-support-28331000" target="_blank" rel="noopener">28331000</a></span>)</li>
<li>Isiflex shower hose 1.60m (<span style="text-decoration: underline;"><a href="https://nexus-home.com/hansgrohe-isiflex-1-60m-shower-hose-28276000" target="_blank" rel="noopener">28276000</a></span>)</li>
</ul></div></div></div>