<p><span style="font-size: medium;"><strong>Hansgrohe Croma Select S 110 Multi EcoSmart Hand Shower</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Croma Select S Multi EcoSmart 9 l/min Hand Shower</li>
<li>Shower head size: 110 mm</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Spray type: SoftRain, IntenseRain, Massage spray</li>
<li>Mininum operating pressure 1.5 bar</li>
<li>Easy to clean, white spray face</li>
</ul>


