<style>#html-body [data-pb-style=SSX1DKH]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="SSX1DKH"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Flavel Emberglow High Efficiency Balanced Flue Gas Fire - Glass Fronted</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions: Height 708mm x Width 673mm</li>
<li>Full depth hearth outset gas fire</li>
<li>Heat type: Radiant &amp; convected</li>
<li>Direct Heat Output: 4.3kW</li>
<li>Energy Efficiency: 86.9 %</li>
<li>Control: Switch manual Control</li>
<li>Fuel bed: Coal effect</li>
<li>Fuel type: Natural gas</li>
<li>Fire back Option: Plain black</li>
</ul></div></div></div>