<p><span style="font-size: medium;"><strong>Grohe Eurodisc Joy XL-Size Basin Mixer Tap - 23428LS0</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Grohe Eurodisc Joy Single Lever XL-Size Basin Mixer Tap</li>
<li>For free standing basins</li>
<li>Single hole installation</li>
<li>Metal lever</li>
<li><strong>GROHE SilkMove&reg;</strong> Joystick cartridge</li>
<li><strong>GROHE StarLight&reg;</strong> chrome finish</li>
<li><strong>GROHE EcoJoy&reg;</strong> SpeedClean mousseur 5.7 l/min</li>
<li>Smooth body</li>
<li>Flexible connection hoses</li>
<li><strong>GROHE QuickFixTM Plus</strong> installation system</li>
</ul>
