<p><span style="font-size: medium;"><strong>Hansgrohe Ecostat E Concealed Thermostatic Mixer with Shut Off Valve - 15707000</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Ecostat E Concealed Thermostatic Mixer with Shut Off Valve</li>
<li>Designed to run 1 outlet</li>
<li>Safety stop at 40&deg;C</li>
<li>Flow rate: 26 l/min</li>
<li>Operating pressure: min 1 bar / max 10 bar</li>
<li>Wall-mounted</li>
</ul>
