Banyo offers Hudson Reed Indus Round Twin Concealed Thermostatic Valve with Diverter Chrome - RND3207 with amazingly Affordable Prices and Manufacturer's Guarantee. Dont Miss this great discount offer. For more information please visit banyo.co.uk