<p><span style="font-size: medium;"><strong>Hansgrohe Crometta E 240 1 Jet EcoSmart Shower Overhead</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Crometta E 240 1 Jet EcoSmart 9l/min Overhead Shower</li>
<li>Finish : Chrome</li>
<li>Shower head size: 240 x 240 mm</li>
<li>Spray pattern: Rain</li>
<li>Flow rate Rain 9 l/min at 3 bar</li>
<li>Operating pressure: min. 1 bar/max. 6 bar</li>
<li>Fully chrome-plated spray face</li>
<li>Spray face: plastic</li>
<li>Installation: ceiling or wall</li>
<li>QuickClean technology for easy limescale removal</li>
<li>Winner of the iF product design award 2016</li>
</ul>
