<p><span style="font-size: medium;"><strong>Ekofires Eko 1080 - LED Timeless Electric Fire</strong></span></p>
<p><strong>Beautiful hand polished cast fascia in satin chrome finish or black. An eclectic mix of classical design features from period fireplaces that transcend the fashions of time.</strong></p>
<p class="bot">The 1080 is a NEW electric fire featuring LED technology designed to significantly improve the flame picture and running performance. This modern technology is not only easier on the eye but it is a fraction of the cost to run a standard conventional bulb and will last longer too. To keep the operation simple you have the three control options: 1) Flame effect only, 2) Flame + 1kW Heat, 3) Flame + 2kW Heat. The controls are mounted discretely under the hood and can be accessed easily.The decorative solid cast iron fascia is simplicity and elegance at is best. It is a design that is equally at home in modern and traditional interiors.Also included are two detachable spacer frames to allow the fire to be installed in a fireplace; fully inset (requires a 5" fireplace depth), semi inset (3" fireplace depth) or simply freestanding without a fireplace to fit flush against a wall.The 1080 is specified with a one piece fixed realistic moulded coal fuelbed which provides a warm under fuelbed glow that you would expect from a real gas fire. This product is covered by our comprehensive 3 year guarantee.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Efficiency: 100%</li>
<li>Installation: Inset or freestanding</li>
<li>Fuel type: Electric</li>
<li>Air vent required: Not applicable</li>
<li>Safety: Thermal trip switch</li>
<li>Heat direction: Frontwards</li>
<li>Control types: High level - front - below canopy (manual - switches)</li>
<li>Fire type: Electric inset or freestanding</li>
<li>Chimney/flue requirements: No chimney or flue required</li>
<li>Heat input (max/min gross): 2.0kW / 1.0kW</li>
<li>Heat output (max/min gross): 2.0kW / 1.0kW</li>
<li>Opening height (min-max): 560mm - 580mm</li>
<li>Opening width (min-max): 400mm - 450mm</li>
<li>Opening depth 0mm (2 spacers), 57mm (1 spacer), 114mm (0 spacers)</li>
</ul>