<p><span style="font-size: Medium;"><strong>Hansgrohe Crometta Vario 100 0.65m Shower Set with Casetta - 26553400 </strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Consists of: hand shower, shower bar, shower hose, slider, soap dish</li>
<li>Shower head size: 100 mm</li>
<li>Spray pattern: rain, intenserain</li>
<li>Spray type adjustment by turning</li>
<li>Hand shower holder inclination angle can be adjusted by 45&deg;</li>
<li>Maximum flow rate 13.8 l/min at 3 bar</li>
<li>Pivot connector prevent hose from tangling</li>
<li>Wall-mounted: screw fixing</li>
<li>Wall supports: plastic</li>
<li>Shower bar diameter: 22 mm</li>
<li>Profile shower bar: round</li>
<li>Noise class: I</li>
</ul>
