<p><span style="font-size: medium;"><strong>Franke Arcana AHK 651 Ceramic Inset 1.5 Bowl Sink</strong></span></p>
<p>Franke Arcana AHK 611 Ceramic 1.0 Bowl Kitchen Sink White</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul> 
<li>One and half bowls</li>
<li>Material: Ceramic</li>
<li>Sink type: Inset</li>
<li>Finish: White</li>
<li>Cabinet Size: 600mm</li>
<li>Length Overall: 1000mm</li>
<li>Width Overall: 510mm</li>
<li>Length of large bowl: 410mm</li>
<li>Width of large bowl: 310mm</li>
<li>Depth of large bowl: 220mm</li>
<li>Length of small bowl: 310mm</li>
<li>Width of small bowl: 16010mm</li>
<li>Cutout Length: 970mm</li>
<li>Cutout Width: 480mm</li>
<li>Position of drainer: Reversible</li>
</ul>
