<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Installation: Undermount</li>
<li>Material: Granite</li>
<li>Cabinet width: 500mm</li>
<li>Bowl depth: 190mm</li>
<li>Style: Single Bowl Sink</li>
<li>Timelessly elegant, contoured bowl design</li>
<li>Elegant and hygienic: the covered C-overflow&reg;</li>
<li>Entire system for a wide variety of plans featuring large and small bowls</li>
<li>Maximum bowl size provided by the very best in production and mounting technology</li>
</ul>
<p><span style="font-size: medium;"><strong>Scope of supply</strong></span></p>
<ul>
<li>Waste fitting with space-saving pipe</li>
<li>3 1&sol;2&quot; basket strainer</li>
</ul>


