<style>#html-body [data-pb-style=BBUS0HE]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="html" data-appearance="default" data-element="main"></div><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="BBUS0HE"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Gazco Studio 1 Glass Fronted Balanced Flue Gas Fire</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Fuel type: Natural gas</li>
<li>Heating efficiency: 92%</li>
<li>Heat output (kW): Upto 5.3kW</li>
<li>Flue diameter:Top 150mm (6")</li>
<li>Minimalist, Modern perfection.</li>
<li>Fuel beds: Logs, Pebble &amp; Stone, Driftwood</li>
<li>Supplied with programmable thermostatic remote control</li>
<li>Conventional flue liner-less installation with no requirement for additional adapters</li>
</ul></div></div></div>