<p><span style="font-size: medium;"><strong>Blanco Andano 500-U Undermount Stainless Steel Kitchen Sink</strong></span></p>
<p>Blanco with its more than 90 years&rsquo; experience in crafting the <a href="/brands/blanco/stainlesssteel.html" target="_blank"><span style="text-decoration: underline;"> stainless steel kitchen sinks </span></a>has now introduced the Blanco Andano 500-U, an undermount kitchen sink. Blanco Andano 500-U with its finest design is just the right one sink to give your kitchen an outlook with geometrical designing. This undermount kitchen sink is flawlessly built to be used as an individual main kitchen sink. Blanco Andano 500-U, additionally, features a manually controlled overflow and waste fitting with a space-saving pipe. This undermount kitchen sink also comes with a 3 1&sol;2&quot; basket strainer waste and a fixing kit. This stainless steel sink has 60cm cabinet width and the depth of the bowl is 190mm.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Installation : Undermount</li>
<li>Bowl depth: 190mm</li>
<li>Cabinet width: 600mm</li>
<li>Material: Stainless Steel</li>
<li>Style: Single Bowl SS Sink</li>
<li>Large bowl capacity and fully utilisable base</li>
<li>Unique composition of optical and functional elements</li>
<li>The harmonious interplay between the radii and surface design creates a modern appeal</li>
<li>High quality features consisting of a covered c-overflow&trade; and modern basket strainer</li>
</ul>
<p><span style="font-size: medium;"><strong>Scope of supply</strong></span></p>
<ul>
<li>Waste and overflow fitting with space-saving pipe</li>
<li>3 1&sol;2&quot; basket strainer</li>
<li>Fixing kit (sealing not included)</li>
</ul>

