<p><span style="font-size: medium;"><strong>Roca The Gap Floor-standing WC Pan with Dual Outlet </strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Roca The Gap Floor-standing WC Pan with Dual Outlet</li>
<li>Dimensions: 440 mm Height x 350 mm Width x 610 mm Length</li>
<li>Finish: White</li>
<li>Back-to-wall</li>
<li>Comfort height</li>
<li>Elbow included</li>
<li>Fixing kit: Included</li>
<li>Flushing system: Washdown</li>
<li>Installation type: Floor-standing</li>
<li>Outlet type: Horizontal</li>
<li>Rim type: Closed</li>
<li>Shape: Square </li>

</ul>

<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>

<li>25 year Guarantee on toilets</li>

<li>2 Year Guarantee on toilet seat</li>

</ul>


