<p><span style="font-size: medium;"><strong>Franke Zurich Kitchen Sink Mixer Tap - Silk Steel</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Version: Swivel spout</li>
<li>Finish: Silk Steel</li>
<li>Handle width: 155mm</li>
<li>Height overall: 275mm</li>
<li>Height to end of spout: 230mm</li>
<li>Spout reach: 210mm</li>
<li>Hot flow rate at 0.3 bar: 5.1 litres/min</li>
<li>Suitable for low-pressure system: Yes</li>
</ul>