<p><span style="font-size: medium;"><strong>Spartherm Cubo L Free Standing Wood Burning Stove</strong></span></p>

<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Energy efficiency class: <a title="Energy efficiency class" href="https://www.banyo.co.uk/media/pdf/Energy_label_Cubo_L.pdf" target="_blank"><img alt="" src="/media/wysiwyg/a.jpg" height="20" width="35" /></a></li>
<li>Nominal heat output: 5,9 kw </li>
<li>Thermal output range: 4,5-7,7 kw</li>
<li>Efficiency: >80%</li>
<li>Door frame height: 572mm</li>
<li>Door frame width: 344/344mm</li>
<li>Total height: 1436mm</li>
<li>Total width: 406mm</li>
<li>Total depth: 406mm</li>
<li>Flue pipe diameter: 150mm</li>
<li>Door function: hinged</li>
<li>Weight: 180kg</li>
</ul>

