<p><span style="font-size: medium;"><strong>HIB Exos 50 Single Door Bathroom Mirror Cabinet 500 x 700mm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Lumens: 2100</li>
<li>IP rating: IP44</li>
<li>Energy rating: E</li>
<li>Net weight: 14.5kg </li>
<li>Number of shelves: 3</li>
<li>Charging socket: Yes (+ USB)</li>
<li>Watts: 85W</li>
<li>Sensor switch</li>
<li>Heated pad in mirrored door</li>
<li>Illumination type: LED 6000k</li>
<li>Precision door illumination border</li>
</ul>