<p><span style="font-size: medium;"><strong>Elica Haiku Chimney Hood</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Energy class: A</li>
<li>Available sizes: 320, 600, 900, 1200mm</li>
<li>Lighting: Strip led 1x7 w 3000 k</li>
<li>Noise level: 51 db(A)</li>
<li>Duct size: 150mm</li>
<li>Version: Duct out</li>
<li>Controls: 3 speeds + 2 boost touch control</li>
<li>Total power absorption: 277 w</li>
<li>Booster airflow: 690m<sup>3</sup>/h</li>
<li>Available finishes: Black glass, White krion, Stainless steel</li>
</ul>

<p><span style="font-size: medium;"><strong>Product benefits</strong></span></p>
<ul>
<li>Special material</li>
<li>Back aspiration</li>
<li>Comfort silence</li>
<li>Long life filter</li>
<li>Total integration</li>
</ul>

