<p><span style="font-size: medium;"><strong>Nuie Provost Semi Flush to Wall Close Coupled Toilet</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Comes in white finish</li>
<li>Design: Contemporary, short projection pan</li>
<li>Cistern full flush: 6 litre</li>
<li>Cistern half flush: 3 litre</li>
<li>Push button flush system</li>
<li>Seat hinge type: Top fix, quick release</li>
<li>Complete order: Pan & cistern</li>
<li>To avoid any damages, the fittings should be installed with extra care</li>
<li>5 years guarantee from the manufacturer</li>
</ul>