<p><span style="font-size: medium;"><strong>Aga Ellesmere EC5 Free Standing Wide Electric Stove - ELL-ELEC-A5W</strong></span></p>
<p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Style: Contemporary</li>
<li>Position: Free Standing</li>
<li>Fuel: Electric</li>
<li>Smoke Control Exempt: Yes</li>
<li>Heat Output Range : 0.9KW to 1.9KW</li>
</ul>
<p><span style="font-size: medium;"><strong>Technical Specifications</strong></span></p>
<ul>
<li>Fuel: Electric</li>
<li>Height: 628mm</li>
<li>Width: 576mm</li>
<li>Depth: 375mm</li>
<li>Material: Steel</li>
</ul>