<p><span style="font-size: medium;"><strong>Ekofires Eko 3015 Fingerslide - Open Fronted Gas Fire</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Efficiency : 50%</li>
<li>Control Type : Finger Slide</li>
<li>Fire Type : Slimline Radiant</li>
<li>Installation : Inset - Fireplace</li>
<li>Chimney/Flue : Conventional Chimney</li>
<li>Heat Input (Max/Min) Gross : 6.2kW / 3.5kW</li>
<li>Heat Output (Max/Min) Gross : 3.1kW / 1.8kW</li>
<li>Outline Dimensions : W485 x H590 x D108 (mm)</li>
<li>Safety : Oxygen Depletion Sensor, Flame Failure Device</li>
<li>Requirements : Pre-cast Flue, Pre-fabricated flue (min.5")</li>
<li>Options : Coal or pebble fuelbed Choice of frets and frames</li>
<li>The eko 3010 is also available with a realistic pebble fuelbed for a more contemporary twist.</li>
<li>The elegant Blenheim shown in polished brass is just one of the available fret options that can be selected to personalise your fire.</li>
<li>Mix and match options. Ultra slim yet classic in design the eko 3010 can be fully tailored to complement your existing d&eacute;cor. Choose from a range of finishes including chrome, black and brass.</li>
</ul>
