<style>#html-body [data-pb-style=M18B6Y0]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="M18B6Y0"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Franke Maris MRX 210-45 Inset 1 Bowl Kitchen Sink Stainless Steel</strong></span></p>
<p>This stylish Franke Maris sink will be a compliment to any modern kitchen. The Franke Maris MRX 210-45 Inset 1 Bowl sink offers practicality and convenience for efficient meal preparation and clean-up.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Single bowl sink</li>
<li>Cabinet size: 500mm</li>
<li>Installation type: Inset</li>
<li>Sink: Stainless steel</li>
<li>Edge profile slimtop</li>
</ul></div></div></div>