<p><span style="font-size: medium;"><strong>Matki Eauzone Plus 10mm Wet Room Panel with Hinge Panel</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>10mm solid safety glass (EN12150-1)</li>
<li>Silver/Chrome finish as standard</li>
<li>High quality solid brass fittings and high-lustre aluminium wall mount</li>
<li>Featuring a special glass sealing system</li>
<li>Tested beyond CE requirements</li>
<li>Matki 10-year guarantee</li>
<li>Matki glass guard easy clean protection included</li>
<li>Brushed gold finish available with bespoke minimal, recessed and no frame options only</li>
</ul>
