<p><span style="font-size: medium;"><strong>Matki Illusion Recess Shower Door - IR</strong></span></p>
<p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>8mm solid safety&nbsp;glass (EN12150-1)</li>
<li>Available in chrome or matt black finish>/li>
<li>Matt black finish only available with soft return handle</li>
<li>High quality brass hinges and handle</li>
<li>Aluminium and mirror-polished stainless&nbsp;steel framing</li>
<li>Offset hinge system holding the door in place and allowing for the widest possible entrance</li>
<li>Tested beyond CE requirements</li>
<li>Matki glass guard easy&nbsp;clean protection included</li>
<li>Matki 10-year guarantee</li>
</ul>
