<p><span style="font-size: medium;"><strong>Hansgrohe Talis S Manual Single Lever Bath/Shower Mixer for Concealed Installation - 72405000 </strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Talis S Manual Single Lever Bath/Shower Mixer for Concealed Installation</li>
<li>Finish: Chrome</li>
<li>Ceramic cartridge</li>
<li>Automatically reverts from shower to bath spout when turned off</li>
<li>Designed to run 2 outlets</li>
<li>Concealed installation</li>
<li>Non-thermostatic</li>
<li>Operating pressure: min. 1 bar/max. 10 bar</li>
<li>Includes: escutcheon, handle, sleeve, mixing unit </li>
</ul>
