<style>#html-body [data-pb-style=ROTMOI2]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="ROTMOI2"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Reginox Alaska 1.5 Bowl Kitchen Sink</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Installation : Undermount</li>
<li>Material: Stainless Steel</li>
<li>Stainless steel gauge: 0.8mm</li>
<li>Drainer Position : Reversible</li>
<li>Finish: Polished Inox</li>
<li>Minimum cabinet size: 600mm</li>
<li>Sink unit dimensions: 342 x 410 / 145 x 335 mm</li>
<li>Total dimensions: 577 x 470 mm</li>
<li>Large bowl depth: 160mm</li>
<li>Small bowl depth 130mm</li>
<li>Outlet : 3.5" outlet</li>
<li>Strainer Waste Included</li>
<li>Supplied With Fitting kit</li>
<li>Warranty/Guarantee: Lifetime</li>
</ul></div></div></div>