<p><span style="font-size: medium;"><strong>Aeon F-Bar Designer Radiator Stainless steel 440mm X 450mm</strong></span></p>
<p>The <a title="Aeon" href="https://www.banyo.co.uk/brands/aeon.html" target="_blank">AEON</a> F-Bar Stainless steel Radiator is a top of the range Designer modern radiator that is a must have for any modern home.</p>
<p>The AEON range has some of the highest heat outputs on the market for a Stainless steel range. This particular product is made from the highest quality stainless steel.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Finish: Brushed matt&comma; Polished</li>
<li>Perfect for small bathrooms or en-suites.</li>
<li>A simple and practical space&dash;saving design</li>
<li>The contemporary compact design is both functional and stylish.</li>
<li>F&dash;Bar is the perfect wall-mounted towel rail that offers plenty of towel storage in an attractive but practical shelf design.</li>
 </ul>
<p><img style="width: 673px; height: 60px;" src="/media/wysiwyg/aeon-radiators/spec-2.jpg" alt="Aeon"></p>
<p><span style="font-size: medium;"><strong>Key Information</strong></span></p>
<ul>
<li>Fuel options: E: Electric only H: Hot Water only D: Dual Fuel.</li>
<li>We recommend pipework is not installed until receipt of radiator</li>
<li>Outputs published are to EN442 at &Delta; T50. Multiply by 1.268 to convert the outputs to &Delta;T60.</li>
<li>Pipe centre measurements are incorporating pair of valve distance of 45mm each where applicable.</li>
</ul>