<p><span style="font-size: medium;"><strong>Hansgrohe Focus Single Lever 100 Basin Mixer Tap & Waste</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Focus Single Lever 100 Basin Mixer Tap with Pop-up Waste</li>
<li>Finish : Chrome</li>
<li>ComfortZone 100 provides space for greater freedom of movement</li>
<li>Spout 119 mm long</li>
<li>Normal spray</li>
<li>5 l/min at 3 bar</li>
<li>Operating pressure: min. 1 bar/max. 10 bar</li>
<li>Deck mounted</li>
<li>Ceramic cartridge</li>
<li>Pop-up waste</li>
<li>QuickClean technology for easy limescale removal</li>
<li>Please specify when ordering if required for low pressure</li>
</ul>

