<p><span style="font-size: Medium;"><strong>Hansgrohe Croma Select S Vario EcoSmart 9 l/ min Hand Shower - 26803400</strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Shower head size: 110 mm</li>
<li>Spray pattern: rain, turbo rain, intenserain</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Maximum flow rate (at 3 bar): 9 l/min</li>
<li>Minimum flow pressure: 1,4 bar</li>
<li>Operating pressure: Min. 1 bar/max. 6 bar</li>
<li>With internal water conduction</li>
<li>Rinseable screen seal</li>
<li>Connection thread G&frac12;</li>
<li>Mininum operating pressure 1.5 bar</li>
<li>Winner of the if product design award 2015</li>
</ul>
