<p><span style="font-size: medium;"><strong>Hudson Reed Harrow Heated Towel Rail - MTY022</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Add a classic feature to your room with this high gloss, timeless radiator</li>
<li>All heating products come complete with fixing screws</li>
<li>All tappings are 1&sol;2&quot; British Standard Pipe</li>
</ul>
<p><span style="font-size: medium;"><strong>Specifications</strong></span></p>
<ul>
<li>Product Material: Steel</li>
<li>Colour: Chrome</li>
<li>Towel Rail: 965mm x 673mm</li>
<li>Wall to Centre of Tappings: 100</li>
<li>Floor To Centre of Tappings: 105</li>
<li>Packaging Volume (L): 217</li>
<li>BTU &commat; 50&deg;C: 1778</li>
<li>Tube Diameter: 32mm</li>
<li>Pipe Centres &lowbar; If Vertical: 438mm</li>
<li>Thermal Output &commat; 50&deg;C (Watts): 521</li>
<li>Mount Type: Floor Mounted</li>
<li>Product Style: Vertical</li>
</ul>