<style>#html-body [data-pb-style=N9O0XMX]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="N9O0XMX"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: Medium;"><strong>Hansgrohe Raindance Select 150 3jet EcoSmart Hand Shower - 28588000 28588400</strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Raindance Select 150 3jet EcoSmart Hand Shower</li>
<li>Shower head size: 150 mm</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Spray type: RainAir (rain jet enriched with air), CaresseAir, Mix</li>
<li>Maximum flow rate (at 3 bar): 9 l/min</li>
<li>Operating pressure: Min. 1.5 bar / max. 6 bar</li>
<li>Easy to clean, white spray face</li>
</ul></div></div></div>