<p><span style="font-size: Medium;"><strong>Hansgrohe Crometta E 240 1jet LowPressure min. 0.2 bar Overhead Shower - 26722000 </strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Finish : Chrome</li>
<li>Shower head size: 240 x 240 mm</li>
<li>Spray pattern: Rain</li>
<li>Fully chrome-plated spray face</li>
<li>Spray face: Plastic</li>
<li>Installation: Ceiling or wall</li>
<li>QuickClean technology for easy limescale removal</li>
<li>Winner of the iF product design award 2016</li>
</ul>
