<p><span style="font-size: medium;"><strong>Hudson Reed Lennox Twin Concealed Thermostatic Shower Valve with Diverter Chrome - SQR3207</strong></span></p><p>
The <span style="text-decoration: underline;"><a href="/brands/hudson-reed.html" target="_blank">Hudson Reed</a></span> Lennox shower range offers cool sophistication and an ultra slim profile for a minimalist finish, perfect for co-ordinating with our range of slimline shower heads. Suitable for all types of plumbing installation this shower valve has the added safety benefit of a built in anti scald device should the cold water supply fail.
</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Slimline design</li>
<li>Can be fitted vertically or horizontally</li>
<li>Accurate flow control</li>
<li>Thermostatic control to &plus; &sol;- 2 degrees even if the water pressure fluctuates</li>
<li>Full thermal protection to prevent scalding in the event of hot or cold water shut off</li>
<li>In the event of hot or cold water failure the valve will shut down as per the relevant standard</li>
<li>The patented cartridge is highly resistant to calcium build up - even in hard water areas</li>
<li>Our valves are suitable for use with all systems: gravity fed pumped unvented high pressure or fully modulated combi-boilers</li>
<li>Excellent flow rates - even at low pressure</li>
<li>The cartridge is fully reversible meaning if hot and cold supplies are the wrong way round it doesn't need re-plumbing</li>
<li>Simply remove the cartridge turn 180&deg; and replace</li>
</ul>
<p><span style="font-size: medium;"><strong>Specifications</strong></span></p>
<ul>
<li>Product Material: BRASS&sol;ABS</li>
<li>Valve&sol;Cartridge Type: 1&sol;4 Turn Ceramic Disc</li>
<li>Pipe Size: 15mm &amp; 22mm</li>
<li>Operating Pressure: 0.5</li>
<li>Flow Rate 0.5Bar l&sol;m (Showers): 13</li>
<li>Flow Rate 1Bar l&sol;m (Showers): 17</li>
<li>Flow Rate 2Bar l&sol;m (Showers): 24</li>
<li>Flow Rate 3Bar l&sol;m (Showers): 27</li>
<li>Valve Included</li>
<li>Valve Handle Included</li>
<li>Valve Handle Type&sol;Shape: Square Handle</li>
<li>Valve Mount Type: Concealed Shower</li>
<li>Shower Valve Style Shape: Square</li>
<li>Stain Rust Resistant</li>
<li>Cartridge Included</li>
</ul>