<style>#html-body [data-pb-style=UCPYF7A]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="UCPYF7A"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Aga Ellesmere EC5 Gas Stove</strong></span></p>
<p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Style: Contemporary</li>
<li>Position: Free Standing</li>
<li>Fuel: Natural Gas</li>
<li>Energy Rating: A+
</li>
<li>Smoke Control Exempt: Yes</li>
<li>Heat Output Range : 2KW to 5.5KW</li>
<li>Flue Top: Yes</li>
<li>Flue Rear: Yes</li>
</ul>
<p><span style="font-size: medium;"><strong>Technical Specifications</strong></span></p>
<ul>
<li>Fuel: Natural Gas</li>
<li>Height: 540mm</li>
<li>Width: 438mm</li>
<li>Depth: 378mm</li>
<li>Material: Steel</li>
</ul></div></div></div>