<p><span style="font-size: medium;"><strong>Grohe Euphoria Hand Shower Chrome - 27220000</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>




<ul>
<li>Euphoria 110 Duo</li>
<li>Hand shower 2 sprays</li>
<li>Rain, SmartRain</li>
<li>Smart Rain</li>
<li>GROHE DreamSpray</li>
<li>GROHE SprayDimmer (Stepless flow rate reduction)</li>
<li>GROHE StarLight chrome finish</li>
<li>SpeedClean anti-limescale system</li>
<li>Inner WaterGuide for a longer life</li>
<li>Min recommended pressure 1.0 bar</li>
</ul>


