<p><span style="font-size: medium;"><strong>Elica Dolce Matt White Chimney Hood 86cm </strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Energy class: B</li>
<li>Color: Matt White</li>
<li>Lighting: Strip LED 1 X 7 W - 4000 K</li>
<li>Min-Max noise level: 46-61 db(A)</li>
<li>Version: Duct-out / Re-circulating</li>
<li>Controls: 3 speeds + boost Infrared touch control</li>
<li>Total power absorption (W): 207 W</li>
<li>Booster airflow: 580m&sup3;/h</li>
</ul>