<p><span style="font-size: Medium;"><strong>Hansgrohe Rainmaker Select 460 3jet Overhead Shower with Ceiling Connector 100mm - 24006400 </strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Consists of: overhead shower, ceiling connector, escutcheon</li>
<li>Shower head size: 466 x 300 mm</li>
<li>Spray pattern: rain, rainstream, monorain</li>
<li>Ball-joint: overhead shower angle adjustable</li>
<li>Spray face: plexiglas</li>
<li>Easy cleanable spray disc in glass optics</li>
<li>Brass ceiling connector</li>
<li>Ceiling connection length: 100 mm</li>
<li>Maximum flow rate 23 l/min at 3 bar</li>
<li>Flow rate rain 17 l/min at 3 bar</li>
<li>Flow rate rainstream 22 l/min at 3 bar</li>
<li>Flow rate mono 23 l/min at 3 bar</li>
<li>Minimum function point for proper function: 11.5 l/min</li>
<li>Operating pressure: min. 1.5 bar/max. 6 bar</li>
<li>The 3 spray zones must be controlled via 3 valves or a diverter valve with 3 outlets</li>
<li>Spray disc removable for cleaning</li>
<li>Overhead shower removable for cleaning</li>
<li>Installation: ceiling</li>
</ul>
