<p><span style="font-size: medium;"><strong>Reina Claro Stainless Steel Vertical Towel Rail 1200 x 300mm</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Output (Watts) &commat; Delta 70: 627</li>
<li>Output (BTU) &commat; Delta 70: 2139</li>
<li>Tube quantity: 17</li>
<li>Water content: 9 Litre</li>	
<li>Comes in chrome finish</li>	
<li>Constructed from superior quality steel material</li>
<li>Suitable for Central, Electric and Dual Fuel Heating Systems</li>
<li>25 Years guarantee from manufacture</li>
</ul>