<style>#html-body [data-pb-style=K4XWCRQ]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="K4XWCRQ"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Hudson Reed Colosseum High Gloss Silver Triple Column Radiator</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Product material: Steel</li>
<li>Type of heat: Water</li>
<li>Mount type: Floor Mounted / Wall Mounted</li>
<li>All tappings are 1/2" British standard pipe</li>
<li>Add a classic feature to your room with this high gloss, timeless radiator</li>
<li>All heating products come complete with fixing screws</li>
</ul></div></div></div>