<p><span style="font-size: medium;"><strong>Premier Vibe Midi Mono Basin Mixer Tap with Waste - TSI305</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Squared edges for a contemporary look</li>
<li>High quality brass internals</li>
<li>Basin & bath tap options</li>
<li>Luxury chrome finish</li>
<li>Coordinating shower valves available</li>
<li>5 years guarantee</li>
<li>Ceramic disc technology for long life and smooth operation</li>
</ul>
<p><span style="font-size: medium;"><strong>Product Details</strong></span></p>
<ul>
<li>Valve/Cartridge Type: Single Lever Cartridge</li>
<li>Product Material: BRASS</li>
<li>Pipe Size: 15 mm (1/2" BSP)</li>
<li>Operating Pressure: 0.10</li>
<li>Flow Rate 0.1Bar l/m (Taps): 8 l/min</li>
<li>Flow Rate 0.5Bar l/m (Taps): 24 l/min</li>
<li>Flow Rate 1Bar l/m (Taps): 33 l/min</li>
<li>Flow Rate 2Bar l/m (Taps): 44 l/min</li>
<li>Cartridge Material: Brass</li>
</ul>