<p><span style="font-size: medium;"><strong>Hansgrohe ShowerTablet Select 300 Exposed Thermostatic Shower Mixer - 13171000 13171400</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe ShowerTablet Select 300 Exposed Thermostatic Shower Mixer</li>
<li>Designed to run 1 outlet</li>
<li>Safety stop at 40&deg;C</li>
<li>Flow rate hand shower connection at 3 bar: 14 l/min</li>
<li>Operating pressure: min. 1 bar / max. 10 bar</li>
<li>Shelf made of safety glass</li>
<li>Shelf colour: chrome or white</li>
<li>Exposed design allows easy installation, all working parts are outside of the wall</li>
<li>In case of installation on existing G &frac12; connections, adaptor no. 02026000 must be used</li>
<li>When installing Select push button products on a pumped system - the pump must have negative head switching.</li>
</ul>

<p><span style="font-size: medium;"><strong>Consists of</strong></span></p>
<ul>
<li>HG S-union Ecostat Select (# 95772000)</li>
</ul>

