<p><span style="font-size: medium;"><strong>Bette Starlet 1880 x 880mm Flair Oval Super Steel Bath - No TH</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Shape : Oval</li>
<li>Double ended bath</li>
<li>Super steel bath</li>
<li>Supplied with no tap hole</li>
<li>Legset, Antislip, Bette GLAZE Plus [Optional]</li>
<li>Centrally-positioned drain</li>
<li>Anti-noise pad is fitted as standard</li>
<li>Made from : sturdy titanium finished steel , refined with a unique BETTEGLAZE enamel finish, which is made using water, glass, quartz, borax and soda</li>
<li>Extremely thin bath edges</li><li>Bette steel baths are heat conducting, hygienic easy care, resistant to chemicals, scratch and impact resistant, UV resistant, and reassuringly robust</li>
</ul>