<style>#html-body [data-pb-style=O3BVSRD]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="O3BVSRD"><div data-content-type="text" data-appearance="default" data-element="main"><p style="font-size: medium;"><strong>Hudson Reed Bath Waste - EA381</strong></p>
<p>The UK Bath Wastes Buy. Vast Range of Bath Wastes in stock with lowest Online Prices</p>
<p style="font-size: medium;"><strong>Features and Benefits</strong></p>
<ul>
<li>With overflow brass plug &amp; ball chain</li>
<li>Suitable for baths up to 20mm thick</li>
</ul>
<p style="font-size: medium;"><strong>Specifications</strong></p>
<ul>
<li>Product material: Brass</li>
<li>Connection size: 11/2"</li>
<li>Waste shape: Round</li>
<li>Overflow projection: 10mm</li>
<li>Waste pipe length: 450mm</li>
</ul></div></div></div>