<p><span style="font-size: medium;"><strong>Valor Excelsior Slimline Convector Inset Gas Fire</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>


<li>Radiant and convected heat</li>

<li>Slimline open fronted convector</li>

<li>Realistic coal effect fuel bed</li>

<li>Colour: Black and Pale Gold</li>

<li>Max heat output: 3.3kw</li>

<li>Nett efficiency rating: 61%</li>

<li>Gas type: Natural gas</li>

<li>Flame effect type: Gas</li>

<li>Control type: Fire slide</li>

<li>Fuel Beds: Coal</li>

</ul>

