<p><span style="font-size: medium;"><strong>HIB Turbo Illuminated Inline Ceiling Fan Chrome - 32300</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Size: Diameter 140mm x Depth 73mm</li>
<li>Complete kit includes shower light fascia, inline fan, 3 meters flexible ducting, external fixed grill &amp; steel hose clamps</li>
<li>High power electric motor</li>
<li>Only 37 decibels</li>
<li>Extraction rate 137m<sup>3</sup>/hr</li>
<li>External fixed grill</li>
<li>3m flexible ducting</li>
<li>Low energy 3 Watt LED bulb</li>
<li>IPX4 - electrically safe for use in the bathroom</li>
</ul>
