<p><span style="font-size: medium;"><strong>Nuie Asselby 1 Tap Hole Basin 600mm & Pedestal</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Basin width: 600mm</li>
<li>Comes in white finish</li>
<li>Modern square design</li>
<li>One tap hole basin</li>
<li>Overflow & cover included</li>
<li>Supplied with pedestal</li>
<li>5 years guarantee from the manufacturer</li>
<li>Waste type required: Slotted </li>
<li>Manufactured from high quality vitreous china</li>
</ul>