<p><span style="font-size: medium;"><strong>Hansgrohe Crometta 100 Green 6?l/ min Hand Shower - 26334400</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Crometta 100 1jet Green 6 l/ min Hand Shower</li>
<li>Finish: White/chrome</li>
<li>Shower head size: 100 mm</li>
<li>Spray pattern: Rain</li>
<li>Maximum flow rate (at 3 bar): 6 l/min</li>
<li>QuickClean technology for easy limescale removal</li>
<li>Mininum operating pressure 0.5 bar</li>
<li>Winner of the iF product design award 2016</li>
</ul>
