<p><span style="font-size: Medium;"><strong>Hansgrohe Raindance AIR Plate 240mm Overhead Shower with Shower Arm - 27474000 </strong></span></p>
<p><span style="font-size: Medium;"><strong>Features</strong></span></p>
<ul>
<li>Consists of: overhead shower, shower arm</li>
<li>Shower head size: 240 mm</li>
<li>Shower arm length: 390 mm</li>
<li>Spray type: RainAir (rain jet enriched with air)</li>
<li>Flow rate RainAir (at 3 bar): 18 l/min</li>
<li>Operating pressure: Min. 1 bar / max. 6 bar</li>
<li>Fully chrome-plated spray face</li>
<li>Material spray face: Metal</li>
<li>Installation type: Wall</li>
</ul>
