<p><span style="font-size: medium;"><strong>Hudson Reed Topaz Bath Taps - BC302HX</strong></span></p><p><strong><span style="font-size: medium;">Features</span></strong></p>
<ul>
<li>Dimensions: Height 137 mm, Width: 66 mm, Depth: 119 mm</li>
<li>Minimum operating pressure 0.1 bar</li>
<li>Suitable for low pressure systems</li>
<li>Crosshead design with hexaganol collar</li>
<li>Chrome finish.</li>
</ul>