<p><span style="font-size: medium;"><strong>Roca Laura Single Floor Standing Back To Wall Pan White</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Roca Laura Back To Wall Pan</li>
<li>Dimensions: 390mm Height x 495mm Width x 360mm Length</li>
<li>White finish WC</li>
<li>Fixing kit: Included</li>
<li>Installation type: Floor-standing</li>
<li>Flushing system: Washdown</li>
<li>Outlet type: Dual</li>
<li>Shape: Round</li>

</ul>

<p><span style="font-size: medium;"><strong>Guarantee</strong></span></p>
<ul>

<li>25 year Guarantee on toilets</li>

<li>2 Year Guarantee on toilet seat</li>

</ul>

