<p><span style="font-size: medium;"><strong>Hansgrohe Talis E Single Lever 110 Basin LowFlow Tap & Waste</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Talis E Single Lever 110 Basin LowFlow 3.5 l/min Tap with Pop-up Waste</li>
<li>Finish : Chrome</li>
<li>ComfortZone 110 provides space for greater freedom of movement</li>
<li>Spout 112 mm long</li>
<li>Normal spray</li>
<li>3.5 l/min at 3 bar</li>
<li>Deck mounted</li>
<li>Ceramic cartridge</li>
<li>Pop-up waste</li>
<li>QuickClean technology for easy limescale removal</li>
</ul>

