<p style="font-size: medium;"><strong>Hudson Reed Topaz Bidet Mixer Tap - BC306HX</strong></p><p style="font-size: medium;"><strong>Features and Benefits</strong></p>
<ul>
<li>Luxury crosshead handle with black indices</li>
<li>Traditional hexagonal collar</li>
<li>High quality Brass internals with a luxury chrome finish</li>
</ul>
<p style="font-size: medium;"><strong>Specifications</strong></p>
<ul>
<li>Includes waste: Waste included</li>
<li>Valve/Cartridge type: 1/4 Turn ceramic disc</li>
<li>Product material: Brass</li>
<li>Pipe size: 15 mm (1/2" BSP)</li>
<li>Operating pressure: 0.1</li>
<li>Flow rate 0.1bar l/m (Taps): 5 l/min</li>
<li>Flow rate 0.5bar l/m (Taps): 16 l/min</li>
<li>Flow rate 1bar l/m (Taps): 24 l/min</li>
<li>Flow rate 2bar l/m (Taps): 33 l/min</li>
<li>Flow rate 3bar l/m (Taps): 38 l/min</li>
</ul>