<p><span style="font-size: medium;"><strong>DRU Metro 150XT Eco Wave Balanced Flue Gas Fire</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Energy efficiency class: <a title="Energy efficiency class" href="/media/pdf/Energy_label_Metro_150XT-41_RCH.pdf" target="_blank"><img alt="Energy label" src="/media/wysiwyg/Screenshot_1_2.jpg" width="35" height="20" /></a></li>
<li>Front View: Single Sided</li>
<li>Natural gas or Propane</li>
<li>Closed combustion system (balanced flue)</li>
<li>Front Glass: Standard, Anti-reflective (Clear View) glass optional</li>
<li>Easy release door system</li>
<li>Remote control included, Smartphone/tablet (wifi) control with communications module (optional)</li>
<li>Thermostat: Yes</li>
<li>Control hatch included </li>
<li>Vario Burner&reg;</li>
<li>Eco Wave: Yes</li>
<li>Material: Steel</li>
<li>Interior: Ceraglass (highly polished black, mirror like affect)</li>
<li>Fire bed: Brown logs, White logs, Grey stones, White stones</li>
<li>Efficiency : 87.9%</li>
<li>Output net - G31 min: 5.3</li>
<li>Output net - G31 max: 11.1</li>
<li>Consumption gas min (L/h): 694</li>
<li>Consumption gas max (L/h): 1562</li>
<li>Built-in depth : 409mm</li>
<li>Fire view width : 1492mm</li>
<li>Fire view height : 410mm</li>
<li>Weight : 160kg</li>
<li>Flue Pipe : 200/130mm</li>
</ul>
<table style="width:100%">
<tr>
 <td width="45%"><p><span style="color: #ff0000;"><strong><span style="color: #000000;"><iframe src="https://www.youtube.com/embed/iVuk7tImXgA" height="300" width="100%"></iframe></span></strong></span></p></td>
<td width="5%"></td>
 <td width="45%"><p><span style="color: #ff0000;"><strong><span style="color: #000000;"><iframe src="https://www.youtube.com/embed/4ZDwluipYYs" height="300" width="100%"></iframe></span></strong></span></p></td>
</tr>
</table>
