<p><span style="font-size: medium;"><strong>Traditional Countess Towel Rail 1548 x 598mm</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Add a classic feature to your room with this high gloss, timeless radiator</li>
<li>This Radiator comes with all fixing screws</li>
<li>All tappings are 1&sol;2&quot; British Standard Pipe</li>
</ul>
<p><span style="font-size: medium;"><strong>Specifications</strong></span></p>
<ul>
<li>Product Material: Steel</li>
<li>Projection: 130mm</li>
<li>Wall to Centre of Tappings: 50</li>
<li>Packaging Volume (L): 142</li>
<li>BTU &commat; 50&deg;C: 922</li>
<li>Tube Diameter: 32mm</li>
<li>Pipe Centres &lowbar; If Vertical: 525mm</li>
<li>Thermal Output &commat; 50&deg;C (Watts): 270</li>
<li>Number Of Sections&sol;Panels: 6</li>
<li>Product Style: Horizontal</li>
</ul>
