<style>#html-body [data-pb-style=NY5YI2B]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="NY5YI2B"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Reginox Hudson Single Lever Kitchen Tap</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Style: Single lever tap</li>
<li>Finish: Brushed nickel</li>
<li>Material: Chrome</li>
<li>Installation: Deck mounted</li>
<li>Spout style: Swivel spout</li>
<li>Min working pressure: 0.3 Bar</li>
<li>Max working pressure: 5.0 Bar</li>
<li>Guarantee: 5 years against manufacturing defects*.</li>
</ul></div></div></div>