<p><span style="font-size: medium;"><strong>Grohe Eurodisc Cosmopolitan S-Size Basin Mixer Tap - 2338220E</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Grohe Eurodisc Cosmopolitan S-Size Basin Mixer Tap</li>
<li>Monobloc installation</li>
<li><strong>GROHE SilkMove&reg; ES</strong></li>
<li>35 mm ceramic cartridge with energy</li>
<li>Saving function via cold start</li>
<li>Metal lever</li>
<li>Temperature limiter</li>
<li><strong>GROHE StarLight&reg;</strong> chrome finish</li>
<li>Adjustable flow rate limiter</li>
<li>Adjustable minimum flow rate 2.5 l/min</li>
<li><strong>GROHE EcoJoy&reg;</strong> mousseur 5.7 l/min</li>
<li>Smooth body</li>
<li>Flexible connection hoses</li>
<li><strong>GROHE QuickFix&trade;</strong> Plus installation</li>
<li>System with centering support</li>
<li><strong>Min. recommended pressure 1.0 bar</strong></li>
</ul>
