<p><span style="font-size: medium;"><strong>Grohe Eurodisc Joy S-Size Bidet Mixer Tap - 24036LS0</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li><strong>Eurodisc Joy</strong></li>
<li><strong>Single-lever bidet mixer 1/2"</strong></li>
<li><strong>S-Size</strong></li>
<li>Single hole installation</li>
<li>GROHE FeatherControlJoystick cartridge</li>
<li>GROHE StarLight&reg;chrome finish</li>
<li>GROHE EcoJoy&reg;ball-jointmousseur 5.7 l/min</li>
<li>GROHE QuickFix&reg; Plusinstallation system</li>
<li>Pop-up waste set 1 1/4"</li>
<li>Flexible connection hoses</li>
</ul>
