<p><span style="font-size: medium;"><strong>Roca Gap Back To Wall Floor Standing Rimless WC Pan</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Dimensions: Length: 350mm x Width: 540mm x Height: 440mm</li>
<li>Outlet type: Dual</li>
<li>Flushing system: Washdown</li>
<li>Installation type: Floor-standing</li>
<li>Rimless Shape:Square</li>
</ul>
<p><strong>Guarantee</strong></p>
<ul>
<li>25 year Guarantee on toilets</li>
<li>2 Year Guarantee on toilet seat</li>
</ul>
