<p><span style="font-size: medium;"><strong>Grohe Eurosmart Cosmopolitan Two Handled Bath/Shower Mixer Tap</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Grohe Eurosmart Cosmopolitan Two Handled Bath/Shower Mixer Tap</li>
<li><strong>Deck mounted</strong></li>
<li>Metal handles</li>
<li>Longlife headpart 3/4"</li>
<li>Automatic diverter: <strong>bath/shower</strong></li>
<li>Integrated non-return valve</li>
<li>In the shower outlet 1/2"</li>
<li><strong>GROHE StarLight&reg;</strong> chrome finish</li>
<li><strong>Min. recommended pressure 0.2 bar</strong></li>
</ul>
