<p><span style="font-size: medium;"><strong>Hansgrohe Talis S Single Lever Bidet Mixer Tap with Pop-up Waste - 72200000 </strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Talis S Single Lever Bidet Mixer Tap with Pop-up Waste</li>
<li>Finish : Chrome</li>
<li>Swivel joint enables directional spray</li>
<li>With fixed spout</li>
<li>Normal spray</li>
<li>Flow rate: 5 l/min at 3 bar</li>
<li>Operating pressure: min. 1 bar/max. 10 bar</li>
<li>Ceramic cartridge</li>
<li>Pop-up waste</li>
<li>QuickClean technology for easy limescale removal</li>
</ul>

