<p><span style="font-size: medium;"><strong>Grohe Eurocube 3 HoleDeck Mounted Basin Mixer Tap - 20351000</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Reach : 97mm</li>
<li>Eurocube</li>
<li>3-hole basin mixer S-Size</li>
<li>Metal lever</li>
<li>Spout with mousseur</li>
<li>GROHE StarLight&reg; chrome finish</li>
<li>Ceramic headparts 1/2", 90&deg;</li>
<li>Pop-up waste set 1 1/4"</li>
<li>GROHE QuickFix Plus installation system</li>
<li>Union nut 1/2" x 10.5 mm</li>
<li>Pressure-proof, flexible connection hoses</li>
<li>Between spout and side valves</li>
<li>Min. recommended pressure 1.0 bar</li>
</ul>
