Banyo offers Hudson Reed Lennox Twin Concealed Thermostatic Shower Valve Chrome - SQR3210 with amazingly Affordable Prices and Manufacturer's Guarantee. Dont Miss this great discount offer. For more information please visit banyo.co.uk