<p><span style="font-size: medium;"><strong>Hansgrohe Raindance Select E 300 2jet EcoSmart 9 l/min Showerpipe - 27282000 27282400</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Raindance Select E 300 2jet EcoSmart 9 l/min Showerpipe</li>
<li>Overhead shower Raindance Select E 300 2jet</li>
<li>Shower head size: 300 x 160 mm</li>
<li>Overhead shower angle adjustable</li>
<li>Spray type: Rain, RainAir (rain jet enriched with air)</li>
<li>Select button to comfortably switch between spray modes</li>
<li>Flow rate RainAir (at 3 bar): 9 l/min</li>
<li>Flow rate Rain (at 3 bar): 9 l/min</li>
<li>Operating pressure: min. 1.5 bar / max. 10 bar</li>
<li>Spray face surface in two variants: chrome or white</li>
<li>Shower arm length: 380 mm</li>
<li>Thermostat Ecostat Select</li>
<li>With spacious shelf</li>
<li>Shelf colour: chrome or white</li>
<li>Safety stop at 40&deg;C</li>
<li>Adjustable hot water limitation</li>
<li>Outlets controlled via volume control/diverter and may not be used simultaneously</li>
<li>Exposed design allows easy installation, all working parts are outside of the wall</li>
<li>In case of installation on existing G &frac12; connections, adaptor no. 02026000 must be used</li>
</ul>
