<style>#html-body [data-pb-style=KSIIVK7]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="KSIIVK7"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>HIB Eclipse Round LED illuminated Magnifying Bathroom Mirror - 21100 </strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>LED illuminated 3x magnifying mirror with rocker switch.</li>
<li>LED Illumination</li>
<li>Maximum extension 30cm</li>
<li>Rocker Switch</li>
<li>IP44 Rated – Electrically safe for use in the bathroom</li>
</ul></div></div></div>