<p><span style="font-size: medium;"><strong>Grohe Eurocube Single Lever XL-Size Basin Mixer Tap - 23406000</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Grohe Eurocube Single Lever XL-Size Basin Mixer Tap</li>
<li><strong>For free-standing basins</strong></li>
<li>Metal lever</li>
<li>Single hole installation</li>
<li>Metal lever</li>
<li><strong>GROHE SilkMove&reg;</strong> 28 mm ceramic cartridge</li>
<li>Temperature limiter</li>
<li><strong>GROHE StarLight&reg;</strong> chrome finish</li>
<li><strong>GROHE EcoJoy&reg;</strong> SpeedClean mousseur 5.7 l/min</li>
<li>Technology for less water and perfect flow</li>
<li>Smooth body</li>
<li>Flexible connection hoses</li>
<li><strong>GROHE Quickfix&reg;</strong> Plus installation system</li>
</ul>
