<p><span style="font-size: medium;"><strong>Hansgrohe Logis 70 Single Lever Bidet Mixer Tap & Waste</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Hansgrohe Logis 70 Single Lever Bidet Mixer Tap with Pop-up Waste</li>
<li>Finish : Chrome</li>
<li>Swivel joint enables directional spray</li>
<li>Normal spray</li>
<li>Flow rate: 7.2 l/min at 3 bar</li>
<li>Ceramic cartridge</li>
<li>Pop-up waste </li>
</ul>
