<p><span style="font-size: medium;"><strong>Royce Morgan Woburn Contemporary Double Ended Bath 1490 x 790mm</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p><ul>
<li>Size: Length 1490mm x Width 790mm x Height 590mm</li>
<li>Contemporary double-ended bath</li>
<li>Weight: 34kg</li>
<li>Weight (with water): 214kg</li>
<li>Flat top finish</li>
<li>Litres to Overflow: 180</li>
<li>Manufactured using European white double skinned sanitary grade acrylic</li>
<li>Excellent thermal properties</li>
<li>Will retain water heat for longer than cast iron baths</li>
<li>Easy to clean and maintain</li>
<li>No tap holes, suitable for freestanding or wall mounted taps</li>
</ul>