<p><span style="font-size: medium;"><strong>Hudson Reed Kristal Twin Concealed Thermostatic Shower Valve Chrome - KRI3210</strong></span></p><p><span style="text-decoration: underline;"><a href="/brands/hudson-reed.html" target="_blank">Hudson Reed</a></span> Kristal Twin Concealed Thermostatic Shower Valve features a clean, minimalist body with a symmetrical crosshead handle design, to provide a stylish yet functional range for any bathroom. A thermostatically controlled shower with separate controls for the flow & temperature.Suitable for all types of plumbing installation this shower valve has the added safety benefit of a built in anti scald device should the cold water supply fail.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Minimalist sleek design</li>
<li>Can be fitted vertically or horizontally</li>
<li>Accurate flow control</li>
<li>Thermostatic control to &plus; &sol;- 2 to 3 &deg;C even if the water pressure fluctuates</li>
<li>In the event of hot or cold water failure, the valve will shut down the water supply providing full thermal protection and prevents scalding</li>
<li>The patented cartridge is highly resistant to calcium build up - even in hard water areas</li>
<li>Our valves are suitable for use with all systems: gravity fed pumped unvented high pressure or fully modulated combi-boilers</li>
<li>Excellent flow rates - even at low pressure</li>
<li>The cartridge is fully reversible meaning if hot and cold supplies are the wrong way round it doesn't need re-plumbing</li>
<li>Simply remove the cartridge turn 180&deg; and replace</li>
<li>Manufactured from high quality brass &amp; ABS</li>
</ul>
<p><span style="font-size: medium;"><strong>Specifications</strong></span></p>
<ul>
<li>Product Material: BRASS&sol;ABS</li>
<li>Valve&sol;Cartridge Type: 1&sol;4 Turn Ceramic Disc</li>
<li>Pipe Size: 15mm (1&sol;2&quot; BSP)</li>
<li>Operating Pressure: 0.1</li>
<li>Flow Rate 0.1Bar l&sol;m (Showers): 5.5</li>
<li>Flow Rate 0.2Bar l&sol;m (Showers): 7.1</li>
<li>Flow Rate 0.5Bar l&sol;m (Showers): 14</li>
<li>Flow Rate 1Bar l&sol;m (Showers): 20</li>
<li>Flow Rate 2Bar l&sol;m (Showers): 29</li>
<li>Flow Rate 3Bar l&sol;m (Showers): 44</li>
<li>Valve Included</li>
<li>Valve Handle Included</li>
<li>Valve Handle Type&sol;Shape: Crosshead Handle</li>
<li>Valve Mount Type: Concealed Shower</li>
<li>Shower Valve Style Shape: Rectangular</li>
<li>Stain Rust Resistant</li>
<li>Cartridge Included</li>
</ul>