<p><span style="font-size: medium;"><strong>Matki Eauzone Plus Slider Door For Recess - EPSR</strong></span></p>
<p>Engineered with reassurance, the EauZone Plus Slider for Recess Door runs along a high grade, Stainless Steel top track with whisper-quiet roller mechanisms.</p>
<p>Exceeding industry standards, the door has been tested to over 100,000 open and close cycles, equivalent to over 100 years of use.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>10mm solid safety glass (EN12150-1)</li>
<li>Chrome finish and linear handle as standard</li>
<li>Stainless steel top track and wall profiles</li>
<li>Soft closure mechanisms</li>
<li>Shaped track inners for an extra smooth door action</li>
<li>Latch for easy cleaning</li>
<li>Tested beyond CE requirements</li>
<li>Matki 10-year Guarantee</li>
<li>Matki glass guard easy clean protection included</li>
</ul>