<p><span style="font-size: medium;"><strong>Hansgrohe Raindance Select S 240 EcoSmart Shower Set</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Hansgrohe Raindance Select 240 Showerpipe for Bath Tub with Swivelling Shower Arm</li>
<li>Overhead shower Raindance S 240 Air</li>
<li>Shower head size: 240 mm</li>
<li>Overhead shower angle adjustable</li>
<li>Spray type: RainAir (rain jet enriched with air)</li>
<li>Flow rate RainAir (at 3 bar): 17 l/min</li>
<li>Operating pressure: min. 1.5 bar / max. 10 bar</li>
<li>Fully chrome-plated spray face</li>
<li>Shower arm length: 460 mm</li>
<li>Swivel shower arm</li>
<li>Thermostat Ecostat Comfort</li>
<li>Flow rate bath filler: 20 l/min</li>
<li>Safety stop at 40&deg;C</li>
<li>Adjustable hot water limitation</li>
<li>Outlets controlled via volume control/diverter and may not be used simultaneously</li>
<li>Exposed design allows easy installation, all working parts are outside of the wall</li>
<li>Height-adjustable hand shower holder</li>
</ul>
<p><span style="font-size: medium;"><strong>Consists of</strong></span></p>
<ul>
<li>Isiflex shower hose 2.00m (<a href="https://nexus-home.com/hansgrohe-isiflex-2-00m-shower-hose-28274000" target="_blank"><span style="text-decoration: underline;">28274000</span></a>)</li>
<li>Raindance Select S 120 3jet hand shower (<a href="https://nexus-home.com/hansgrohe-raindance-select-s-120-3jet-hand-shower-26530000" target="_blank"><span style="text-decoration: underline;">26530000</span></a>)</li>
</ul>