<p><span style="font-size: medium;"><strong>Vitra Minimax S Double Lever Basin Mixer Tap</strong></span></p><p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Comes in chrome finish</li>
<li>Deck mounted tap</li>
<li>2 hole basin tap</li>
<li>Water saving feature </li>
<li>Modern style tap</li>
<li>Flow rate: 9 L/min</li>
<li>Pressure bar: 0.5-10 bar (Recommended 3-5 bar)</li>
<li>10 Years guarantee from manufacturer</li>
</ul>