<p><span style="font-size: medium;"><strong>Hansgrohe Metris 100 Pillar Tap - 31166000</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>ComfortZone 100 provides space for greater freedom of movement</li>
<li>Normal spray</li>
<li>Flow rate: 5 l/min</li>
<li>Operating pressure: min. 1 bar / max. 10 bar</li>
<li>For cold water connection</li>
<li>Without waste set</li>
<li>QuickClean system for easy limescale removal</li>
<li>Please specify when ordering if required for low pressure</li>
</ul>
