<p><span style="font-size: medium;"><strong>Reginox 1.5 Bowl Ceramic Kitchen Inset Sink - RL501CW</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Reginox 1.5 Bowl Ceramic Kitchen Inset Sink</li>
<li>Cabinet Size: 800mm</li>
<li>Sink Unit Dimensions: 310 x 340 / 130 x 280 mm</li>
<li>Total Dimensions: 1000 x 500 mm</li>
<li>Depth: 170 mm / 120 mm</li>
<li>Installation Method : Inset</li>
<li>Outlet : 3,5" outlet</li>
<li>Type: Sinks with drainer, One and half bowl</li>
<li>Packaging : Box</li>
<li>Colour ceramic: White</li>
</ul>
