<p><span style="font-size: medium;"><strong>DIK GEURTS Instyle 600V Next Insert Fire - Wood</strong></span></p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Material: Steel</li>
<li>Horizontal shape</li>
<li>Hinged door system</li>
<li>Control: Manual control</li>
<li>Colours: Dark anthracite</li>
<li>Energy efficiency class: A</li>
<li>Front view Insert wood fire</li>
<li>Interior: Vermiculite natural</li>
<li>Glass window: Standard glass</li>
<li>Combustion system: Combustion air from living area</li>
</ul>
<p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Flue: Top</li>
<li>Flue &Oslash; : 150mm</li>
<li>Efficiency: 79.6%</li>
<li>Weight: 98kg</li>
<li>Output net max: 7.0kw</li>
<li>Output net min: 3.0kw</li>
<li>Max. log length: 420mm</li>
<li>Nominal heat output: 4.9</li>
<li>External air connection: Base / Rear</li>
</ul>


