<style>#html-body [data-pb-style=MV3HXH7]{justify-content:flex-start;display:flex;flex-direction:column;background-position:left top;background-size:cover;background-repeat:no-repeat;background-attachment:scroll}</style><div data-content-type="row" data-appearance="contained" data-element="main"><div data-enable-parallax="0" data-parallax-speed="0.5" data-background-images="{}" data-background-type="image" data-video-loop="true" data-video-play-only-visible="true" data-video-lazy-load="true" data-video-fallback-src="" data-element="inner" data-pb-style="MV3HXH7"><div data-content-type="text" data-appearance="default" data-element="main"><p><span style="font-size: medium;"><strong>Roca Meridian-N Compact Wall Hung Basin 450mm</strong></span></p>
<p>The Roca Meridian-N Compact cloakroom wall hung basin 450mm will bring a touch of luxury with its classic design and exceptional white finish.Made of high grade chinaware it is strong and durable and comes with Roca’s warranty for 25 years.</p>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Vitreous china material</li>
<li>Fixing kit included</li>
<li>Taphole configuration: 1 taphole on the right side</li>
<li>White finish</li>
<li>Square basin shape</li>
</ul></div></div></div>