<p><span style="font-size: medium;"><strong>Hudson Reed Kristal Triple Concealed Thermostatic Shower Valve Chrome</strong></span></p><p><span style="text-decoration: underline;"><a href="/brands/hudson-reed.html" target="_blank">Hudson Reed</a></span> Kristal Twin Concealed Thermostatic Shower Valve features a clean, minimalist body with a symmetrical crosshead handle design, to provide a stylish yet functional range for any bathroom. A thermostatically controlled shower with separate controls for the flow & temperature.Suitable for all types of plumbing installation this shower valve has the added safety benefit of a built in anti scald device should the cold water supply fail.</p>

<p><span style="font-size: medium;"><strong>Specification</strong></span></p>
<ul>
<li>Stain rust resistant</li>
<li>Cartridge included</li>
<li>Operating pressure: 0.1</li>
<li>Pipe size: 15mm (1&#x0002F;2&#x00022; bsp)</li>
<li>Product material: Brass&#x0002F;abs</li>
<li>Valve mount type: Concealed shower</li>
<li>Valve&#x0002F;cartridge type: 1&#x0002F;4 turn ceramic disc</li>
<li>Flow rate 0.1bar l&#x0002F;m (showers): 55</li>
<li>Flow rate 0.2bar l&#x0002F;m (showers): 7.1</li>
<li>Flow rate 0.5bar l&#x0002F;m (showers): 14</li>
<li>Flow rate 1bar l&#x0002F;m (showers): 20</li>
<li>Flow rate 2bar l&#x0002F;m (showers): 29</li>
<li>Flow rate 3bar l&#x0002F;m (showers): 44</li>
<li>TMV2&comma; TMV3 approved</li>
</ul>
<p><span style="font-size: medium;"><strong>Features</strong></span></p>
<ul>
<li>Accurate flow control</li>
<li>Minimalist sleek design</li>
<li>Can be fitted vertically or horizontally</li>
<li>Excellent flow rates &hyphen; even at low pressure</li>
<li>Manufactured from high quality brass &amp; abs</li>
<li>Simply remove the cartridge turn 180&deg; and replace</li>
<li>Thermostatic control to &plus;&#x0002F;&hyphen; 2 to 3 &deg;C even if the water pressure fluctuates</li>
<li>The patented cartridge is highly resistant to calcium build up &hyphen; even in hard water areas</li>
<li>The cartridge is fully reversible meaning if hot and cold supplies are the wrong way round it doesn't need re-plumbing</li>
<li>Our valves are suitable for use with all systems: gravity fed pumped unvented high pressure or fully modulated combi&hyphen;boilers</li>
<li>In the event of hot or cold water failure&comma; the valve will shut down the water supply providing full thermal protection and prevents scalding</li>
</ul>