<p><span style="font-size: medium;"><strong>Ekofires Eko 3030 - Conventional Chimney Gas Fire</strong></span></p><p><span style="font-size: medium;"><strong>Key Features</strong></span></p>
<ul>
<li>Efficiency : 55%</li>
<li>Air Vent Required : N/A</li>
<li>Minimum Room Size : N/A</li>
<li>Installation : Inset - Fireplace</li>
<li>Fire Type : Full Depth Radiant</li>
<li>Control Type : Manual - Rotary / Remote control</li>
<li>Heat Input (Max/Min) Gross : 6.8kW / 3.5kW</li>
<li>Heat Output (Max/Min) Gross : 3.8kW / 1.9kW</li>
<li>Outline Dimensions : W485 x H590 x D180 (mm)</li>
<li>Safety : Oxygen Depletion Sensor, Flame Failure Device</li>
<li>Options : Powaflue Coal, pebble or log fuelbed, Remote control, Choice of frets and frames</li>
<li>Chimney/Flue Requirements : Conventional chimney, Pre-cast flue, Pre-fabricated flue (min.5")</li>
</ul>
